APCAL_HLP_V3.20        m
<HLP_GRP00001>
                                 General Help                Page 1 of 7

    This program contains functions for displaying yearly and monthly
    calendars, editing and printing monthly calendars and daily appoint-
    ments, and setting alarms to remind yourself of important events.

    Throughout the help text in this program the convention used to denote
    when 2 keys must be pressed at the same time is to combine them with
    a plus (+) sign.  For example, Alt+D indicates to press and hold down
    the Alt key and then press the D key.  Then release both.  The arrow
    keys are denoted by Right, Left, Up and Down.

    PULL-DOWN MENU
    --------------
    The pull-down menu at the top of the screen has several options which
    can be used throughout the program.  To activate this menu press the
    Alt key.  This will highlight the "File" field.  The right and left
    arrow keys can be used to move from one field to another.  To pull
    down the sub-menu for a field press the Enter key.  Pressing one of
    the bold characters on the top line of the pull-down will move
    to the field and pull down its sub-menu.  If a sub-menu is already
    pulled down, then the bold characters on the top line are no
<HLP_GRP00002>
                                 General Help                Page 2 of 7

    longer active.  The up and down arrow keys can be used to move from
    one sub-menu field to another.  Pressing Enter, selects the currently
    highlighted sub-menu field.  Pressing the bold character of one
    of the sub-menu fields automatically selects it.  Pressing Esc, exits
    the pull-down without making a selection.  Once a selection is made,
    or Esc pressed, the appropriate action is taken and control is 
    returned to the main menu below.

    When a field in the pull-down menu is not currently active it is dis-
    played in a different color (usually dark grey on most color monitors
    and totally blacked out on monochrome monitors).  Selecting one of
    these fields does nothing.

    The following sections describe the main menu fields of the pull-down
    menu.  The "Edit" section is different depending on what section of
    the program you are in.  It is described in the help for each section.
    Some of the pull-down options can be executed directly, without going
    through the pull-down, these options list the appropriate key(s) (to
    the right in parenthesis) to type to execute the command directly.
<HLP_GRP00003>
                                 General Help                Page 3 of 7

    Files
    -----
    The files section of the main pull-down has the following options:

    Save - Saves the currently displayed appointment, monthly calendar or
       alarm file.
    Delete - Deletes the currently displayed appointment, monthly calendar
       or alarm file.
    Print - Prints the currently displayed appointment or monthly calendar
       file.
    Dos Shell - Temporarily brings up the DOS command line.  It is import-
       ant to remember to type "exit" when you are done, to return to the
       program, since it is still taking up memory.  If you wish to perma-
       nently leave the program use the "Exit" selection below.
    Go Resident - Exits the program, but leaves it resident in memory, so 
       that it can be activated with the hot-key.
    Unload - Exits the program and removes it from memory.  The program
       must have previously been loaded resident.        
    Exit - Exits the program.
<HLP_GRP00004>
                                 General Help                Page 4 of 7

    Options
    -------
    The options section of the main pull-down has the following options:
    Appointments (F2), Alarm (F3), Month Calendar (F4), Year Calendar
    (F5) and Month/Appt. (F6).

    Appointments - switches to the appointment edit screen.  The appoint-
       ment file for the currently selected date is displayed.
    Alarm - switches to the alarm edit screen.  The alarms, if any, for 
       the currently selected date are displayed.
    Month Calendar - switches to the monthly calendar edit screen.  The
       monthly calendar for the currently selected date is displayed.
    Year Calendar - switches to the yearly calendar display.
    Month/Appt. - switches to the split screen month/appointment display.
<HLP_GRP00005>
                                 General Help                Page 5 of 7

    Search
    ------
    The search section of the main pull-down has the following options:
    Forward (F7) and Backward (Shift+F7).  This pull-down sub-menu is only
    active when the split screen month/appointment display is active.

    Forward - search for the given text in appointment files after the
       current date.
    Backward - search for the given text in appointment files before the
       current date.
<HLP_GRP00006>
                                 General Help                Page 6 of 7

    Program Config.
    ---------------
    The configuration section of the main pull-down has the following
    options: Color, Appointment Template, Printer, Holidays, Start Screen,
    Alarm, TSR, Time and Auto Save.

    Color - configures the program colors.
    Appointment Template - configures the default appointment screen.
    Printer - configures printer parameters.
    Holidays - configures the holidays which are automatically built into
       the monthly calendars when the are first created.
    Start Screen - configures the first screen which appears when the 
       program is loaded.
    Alarm - configures the alarm parameters.
    Tsr - configures the parameters associated with loading the program 
       as a TSR.
    Time - configures how times and dates are displayed.
    Auto Save - turns the auto save feature on and off.
<HLP_GRP00007>
                                 General Help                Page 7 of 7

   EXECUTING APCAL
   ---------------  
   The syntax for the APCAL command is:
      APCAL [/L] [/M]
   where: /L  Loads the program as a TSR (Terminate and Stay Resident).
          /M  Forces the program to use the monochrome display attributes.

   If the /L switch is not used, then APCAL can be loaded resident by 
   selecting "Go Resident" from the "File" menu.  When the program is
   resident it can be activated, at any time, with the hot-key and exited
   by selecting "Exit" from the "File" menu.  To completely remove the 
   program from memory, select "Unload" from the "File" menu.  This option
   has no effect if the program is not loaded resident.

   APCAL does not have to be run as a TSR.  You can execute it without the 
   /L switch and exit by selecting the "Exit" option on the "File" menu.  
   The program will be loaded and completely removed from memory each time 
   you run it in this way.  The program cannot be popped up from within 
   other programs, via the hot-key, when run in this way.  Also, alarms
   will not sound unless you are in APCAL at the time of the alarm.                      
<HLP_GRP00201>
                             Appointment Help                Page 1 of 5

    For help on other topics, exit this screen by pressing the Tab key
    until the END field is highlighted and press Enter.  Then press Alt+H
    (press ALT and the H key at the same time) to bring up the help pull
    down menu.  Use the up and down arrow keys to highlight the desired
    topic and press Enter.  If this is your first time in APCAL then you
    should probably select the "General" topic.

    The appointment edit screen is used to enter your schedule for the
    currently selected date.  If a previous schedule was saved for this
    date then it will appear.  If not, then the appointment template will
    be displayed (see "Configuration" help).

    The arrow keys are used to move around the screen.  Appointment text
    can be typed into each appointment slot.  The options on the "File"
    pull down menu can be used to save, print and delete the appointment 
    file.
<HLP_GRP00202>
                             Appointment Help                Page 2 of 5

    The following keys can be used in the appointment edit screen.  Some
    of these can also be selected from the pull-down menu.

    Insert     toggles insert mode on and off.
    Delete     deletes the character at the current cursor position.
    Home       moves to the beginning of the appointment line.
    End        moves to the end of the appointment line.
    Backspace  moves the cursor left and deletes the character at that
               position.
    Enter      moves to the beginning of the next line.
    F1         brings up this help screen.
    F3         switches to the alarm screen.
    F4         switches to the monthly calendar screen.
    F5         switches to the yearly calendar screen.
    F6,TAB     switches to the split screen month/appointment display.
    F9         is used to toggle editing of the time fields.
<HLP_GRP00203>
                             Appointment Help                Page 3 of 5

    Alt        activates the pull-down menu.  Pressing Alt plus one of the
               bold characters in the top pull-down line activates that
               pull-down menu.
    Alt+C      copies the current line to a scratch buffer.
    Alt+M      copies the current line to scratch and then erases it.
    Alt+I      overwrites the current line with the contents of the
               scratch buffer created by the last Alt+C or Alt+M.
    Alt+D      erases the characters from the cursor position to the end
               of the line.
    Alt+L      erases the current line.
    Alt+A      brings up the alarm parameter menu for the appointment at
               the current cursor position.
<HLP_GRP00204>
                             Appointment Help                Page 4 of 5

    To set/remove an alarm for the appointment at the current cursor posi-
    tion press Alt+A.  This brings up the appointment alarm menu.  The
    first field in the alarm menu toggles the alarm ON and OFF.  Press the
    space bar to toggle between the 2 values.  Tab moves to the next field
    and Shift+Tab moves to the previous.  The next field sets the number
    of minutes before the appointment the alarm will sound.  Entering any-
    thing other than an integer number of minutes causes a beep and the
    field cannot be exited until an integer is entered.  The duration
    field sets the number of minutes the alarm will continue to sound if
    it is snoozed.  It must also be an integer.

    For example, if the current appointment time is 2:00 pm and the 
    "Number Of Minutes Before" is set to 15, the alarm will sound at 
    1:45 pm.  If "Snooze" is selected when the alarm sounds, then the 
    alarm will snooze for the time period set in the alarm configuration.  
    If this value is set to 5, then the alarm will sound again 5 minutes 
    from the time at which "Snooze" was selected.  This continues until 
    "End" is selected.  The alarm will also end if the "Duration" time is
    exceeded.  For example, if the duration is set to 15 minutes then the
    alarm will not sound after 2:00 pm, even if it is snoozed.
<HLP_GRP00205>
                             Appointment Help                Page 5 of 5

    Pressing Enter on the OK field sets the alarm using the entered para-
    meters and ends the alarm menu.  Pressing Enter on the CANCEL field
    ends the alarm menu and discards any changes made to the parameters.
    Pressing Esc on any field has the same effect.

    Appointments with alarms have a check in the alarm column.  Up to 10
    alarms can be set for any day.  This includes any alarms set in the
    regular alarm menu.
<HLP_GRP00301>
                           Regular Alarm Help                Page 1 of 4

    For help on other topics, exit this screen by pressing the Tab key
    until the END field is highlighted and press Enter.  Then press Alt+H
    (press ALT and the H key at the same time) to bring up the help pull
    down menu.  Use the up and down arrow keys to highlight the desired
    topic and press Enter.  If this is your first time in APCAL then you
    should probably select the "General" topic.

    There are 2 types of alarms which can be set in this program: Appoint-
    ment alarms and Regular alarms.  The appointment alarms are assoc-
    iated with an appointment and are set in the appointment edit screen.
    Regular and Boot alarms are set in the alarm menu and are not 
    associated with an appointment.

    The top portion of the regular alarm screen consists of the message
    text for each alarm set for the current date.  The arrow (->), at the
    left, points to the selected alarm.  The parameters associated with
    this alarm are displayed in the box in the bottom portion of the
    screen.  The up and down arrow keys can be used to select other alarms
    in the list.  The "File" options on the pull-down menu can be used to
    save and delete the alarm file for the currently selected date.
<HLP_GRP00302>
                           Regular Alarm Help                Page 2 of 4

    The following keys can be used in the alarm screen.  Some of these 
    can also be selected from the pull-down menu.

    F1         brings up this help screen.
    F2         switches to the appointment screen.
    F4         switches to the monthly calendar screen.
    F5         switches to the yearly calendar screen.
    F6         switches to the split screen month/appointment display.
    Alt        activates the pull-down menu.  Pressing Alt plus one of the
               bold characters in the top pull-down line activates that
               pull-down menu.
    Alt+A      adds another alarm.
    Alt+D      deletes the currently selected alarm.
    Alt+M      modifies the currently selected alarm.

    When Alt+A or Alt+M is pressed, the parameter menu at the bottom of
    the screen is activated.  These parameters can then be edited.  Alt+A
    adds a new alarm and Alt+M allows the modification of the parameters
    for the currently selected alarm.  Tab moves to the next field and
    Shift+Tab moves to the previous field in this menu.
<HLP_GRP00303>
                           Regular Alarm Help                Page 3 of 4

    The first field in the alarm parameter menu determines whether the
    alarm is a REGULAR or BOOT alarm.  The space bar toggles between the
    2 values.  Regular alarms occur for the time interval given in the
    start and end time fields.  Boot alarms occur when the computer is
    first booted and continue until midnight unless terminated.

    The start time fields set the time when the alarm will first sound,
    if it is a REGULAR alarm.  The hours field must be an integer between
    1 and 12 (24 in 24 hour mode) and the minutes field must be an integer 
    between 0 and 59.  Entering anything else causes a beep and the field 
    cannot be exited until a valid integer is entered.  The last field on 
    the start time line indicates whether the time is am or pm (not 
    present in 24 hour mode).  The space bar toggles between am and pm.

    The end time sets the end of a REGULAR alarm.  The fields have the
    same restrictions as the start time fields.

    The start and end time are not set for BOOT alarms.
<HLP_GRP00304>
                           Regular Alarm Help                Page 4 of 4

    For example, if a regular alarm is set to start at 1:45 pm and end at
    2:00 pm then the alarm will first sound at 1:45 pm.  If "Snooze" is
    selected when the alarm sounds, then the alarm will snooze for the time
    period set in the alarm configuration.  If this value is 5, then the
    alarm will sound again 5 minutes from the time at which "Snooze" was
    selected.  This continues until "End" is selected or the time is later
    than 2:00 pm.

    The message field sets the text which will be displayed when the alarm
    sounds.

    Pressing Enter on the OK field sets the alarm using the entered para-
    meters and ends the alarm parameter menu.  Pressing Enter on the
    CANCEL field ends the alarm parameter menu and discards any changes
    made to the parameters.  Pressing Esc on any field has the same effect.

    Up to 10 alarms can be set for any day.  This includes any alarms set
    in the appointment menu.
<HLP_GRP00401>
                        Monthly Calendar Help                Page 1 of 3

    For help on other topics, exit this screen by pressing the Tab key
    until the END field is highlighted and press Enter.  Then press Alt+H
    (press ALT and the H key at the same time) to bring up the help pull
    down menu.  Use the up and down arrow keys to highlight the desired
    topic and press Enter.  If this is your first time in APCAL then you
    should probably select the "General" topic.

    The monthly calendar screen can be used just like a wall calendar.
    If a previous calendar was saved for this date then it will appear.
    Otherwise, a new calendar is built and any configured holidays which
    occur within the month are added (see "Configuration" help).  The
    arrow keys are used to move around within a day block.  Any text can
    be typed into a day block.  The "File" options on the pull-down menu 
    can be used to save, print and delete the calendar.
<HLP_GRP00402>
                        Monthly Calendar Help                Page 2 of 3

    The following keys can be used in the calendar edit screen.  Some of
    these can also be selected from the pull-down menu.

    Insert     toggles insert mode on and off.
    Delete     deletes the character at the current cursor position.
    Home       moves to the beginning of the current day block line.
    End        moves to the end of the current day block line.
    Backspace  moves the cursor left and deletes the character at that
               position.
    Enter      moves to the beginning of the next line in the day block.
    Tab        to highlight the next day in the calendar.
    Shift+Tab  to highlight the previous day in the calendar.
    F1         brings up this help screen.
    F2         switches to the appointment screen.
    F3         switches to the alarm screen.
    F5         switches to the yearly calendar screen.
    F6         switches to the split screen month/appointment display.
    Alt        activates the pull-down menu.  Pressing Alt plus one of the
               bold characters in the top pull-down line activates that
               pull-down menu.
<HLP_GRP00403>
                        Monthly Calendar Help                Page 3 of 3

    Ctrl+Right is used to pull up the next monthly calendar.
    Ctrl+Left  is used to pull up the previous monthly calendar.
    Ctrl+Home  returns to the actual date.
<HLP_GRP00501>
                         Yearly Calendar Help                Page 1 of 2

    For help on other topics, exit this screen by pressing the Tab key
    until the END field is highlighted and press Enter.  Then press Alt+H
    (press ALT and the H key at the same time) to bring up the help pull
    down menu.  Use the up and down arrow keys to highlight the desired
    topic and press Enter.  If this is your first time in APCAL then you
    should probably select the "General" topic.

    The yearly calendar screen displays 9 months on the screen and allows 
    you to scroll through them using the arrow keys or Tab and Shift+Tab.  
    This screen sets the month and year used when other options are 
    selected.  For example, highlighting May 1995 and pressing F4 will 
    bring up the monthly calendar for May 1995.
<HLP_GRP00502>
                         Yearly Calendar Help                Page 2 of 2

    The following keys can be used in the yearly calendar screen.  Some of
    these can also be selected from the pull-down menu.

    Tab        to highlight the next monthly calendar.
    Shift+Tab  to highlight the previous monthly calendar.
    F1         brings up this help screen.
    F2         switches to the appointment screen.
    F3         switches to the alarm screen.
    F4         switches to the monthly calendar screen.
    F6         switches to the split screen month/appointment display.
    Alt        activates the pull-down menu.  Pressing Alt plus one of the
               bold characters in the top pull-down line activates that
               pull-down menu.
    Ctrl+Home  to return to the actual date.
<HLP_GRP00601>
                       Month/Appt Screen Help                Page 1 of 2

    For help on other topics, exit this screen by pressing the Tab key
    until the END field is highlighted and press Enter.  Then press Alt+H
    (press ALT and the H key at the same time) to bring up the help pull
    down menu.  Use the up and down arrow keys to highlight the desired
    topic and press Enter.  If this is your first time in APCAL then you
    should probably select the "General" topic.

    The split screen month/appointment display is used to quickly scan
    your appointments for the coming days.  The arrow keys can be used to 
    highlight different days in the month.  The appointment file for that 
    date is displayed on the right.  You may also locate a specific 
    appointment by searching forward or backward, from the currently 
    highlighted date, for a specified text string.  This screen also sets 
    the date used if another option is selected.  For example, pressing 
    TAB will bring up the appointment edit screen for the appointment 
    file displayed on the right in the month/appointment screen.
<HLP_GRP00602>
                       Month/Appt Screen Help                Page 2 of 2

    The following keys can be used in the month/appt screen.  Some of
    these can also be selected from the pull-down menu.

    arrow keys used to highlight different days in the monthly calendars.
    F1         brings up this help screen.
    F2,TAB,CR  switches to the appointment screen.
    F3         switches to the alarm screen.
    F4         switches to the monthly calendar screen.
    F5         switches to the yearly calendar screen.
    F7         search for the given text in the appointment files after
               the currently highlighted date.
    Shift+F7   search for the given text in the appointment files before
               the currently highlighted date.
    Alt        activates the pull-down menu.  Pressing Alt plus one of the
               bold characters in the top pull-down line activates that
               pull-down menu.
    Ctrl+Right scrolls the month display one month ahead.
    Ctrl+Left  scrolls the month display one month back.
    Ctrl+Home  return to current date.
<HLP_GRP01001>
                     Color Configuration Help                Page 1 of 2

    This screen allows the configuration of the colors used by the pro-
    gram.

    To make a selection from the pop-up menu, highlight it using the up
    and down arrow keys and press Enter or just type the field's bold
    character.  The following options are available on the pop-up menu.

    Normal Text - Sets the normal text color.  For example, the color this
       text is in.
    Highlighted Text - Sets the color of highlighted normal text.  For ex-
       ample the color of the current day selected in the split screen
       month/appt display and the color of the current month selected in
       the yearly calendar display.
    Lowlight Text - Sets the color of lowlight text.  For example, the
       color of the appointment section of the split screen month/appt
       display.
    Pop-up Normal - Sets the color of pop-up menus.
    Pop-up Highlighted - Sets the color of the selected field in pop-up
       menus.
<HLP_GRP01002>
                     Color Configuration Help                Page 2 of 2

    Save - Saves the current color selection to the configuration file.
       If this is not done, then any changes made to the color selection
       will remain in affect for this session only.
    Restore Defaults - Reads the values set in the configuration file and
       sets the colors to those values.
    Help - Brings up this help screen.
    Quit - Exits the color configuration.
<HLP_GRP01101>
                    Appointment Template Help                Page 1 of 1

    This screen allows the appointment screen template to be edited.  This
    is the initial screen displayed if no appointment file for the 
    currently selected date is found.  You may configure the times to
    match your typical schedule and set any text you always want to appear 
    in a particular appointment slot.  For example, you may want to block 
    out the 12:00 to 1:00 pm slots for lunch.  You can change the appoint-
    ment schedule times and appointment slots in the appointment edit menu 
    to allow for daily variations to your schedule.  The appointment 
    template is just a starting point for each day.

    To make a selection from the pop-up menu, highlight it using the up
    and down arrow keys and press Enter or just type the field's bold
    character.  The following options are available on the pop-up menu.

    Edit - Allows the editing of the appointment template.  Press Esc to
       end editing and return to the pop-up menu.  Most of the available
       keys in appointment editing (see "Appointment" help) are valid here.
    Save - Saves the appointment template.
    Help - Brings up this help screen.
    Quit - Exits appointment template configuration.
<HLP_GRP01201>
                   Printer Configuration Help                Page 1 of 3

    This screen allows you to select the printer to which all print opera-
    tions will send their output.  It also allows you to configure new
    printers and modify the parameters of existing ones.

    The up and down arrow keys can be used to move the arrow (->) on the
    left through the list of printers.  The parameters for the printer to
    the right of the arrow are displayed in the right portion of the
    screen.  The currently selected printer (the one print output will be 
    sent to) is highlighted.

    The following keys can be used in this configuration menu.

    F1         brings up this help screen.
    F2         selects the default printer.  Move the arrow (->) on the
               left to the desired print device using the up and down
               arrow keys and press F2.  That printer will then be high-
               lighted and all print output will go to it.
    F3         toggles the device the print will be sent to.  Pressing
               F3, cycles through the list of valid options.
<HLP_GRP01202>
                   Printer Configuration Help                Page 2 of 3

    F4         toggles the mode between GRAPHIC and NON-GRAPHIC.  In
               GRAPHIC mode, IBM graphic line characters are output.  In
               NON-GRAPHIC mode, these characters are converted to normal
               ASCII characters.
    F5         allows the editing of the name of the selection currently
               pointed to.  Control is passed to the Printer Name field on
               the right.  Change the name and press Enter to accept it or
               press Esc to cancel the changes.  Control is then returned
               to the printer list on the left.
    F6         allows the editing of the first escape sequence of the sel-
               ection currently pointed to.  Control is passed to the
               "Escape Sequence Before Printing" field on the right.  This
               sequence is output, exactly as it appears in the menu, to 
               the printer before any other output to the printer.  To 
               input values which are not ordinary ASCII characters, press 
               and hold down the Alt key and type the decimal value for the
               character on the numeric key pad (e.g. Alt+2+7 produces the
               escape character).  Press Enter to accept or Esc to cancel
               the changes and return control to the printer list on the
               left.  If the desired sequence is too long for the input
<HLP_GRP01203>
                   Printer Configuration Help                Page 3 of 3

               field, then the text "FILE:" followed by the name of a file
               containing the escape sequence can be entered.
    F7         allows the editing of the second escape sequence of the
               selection currently pointed to.  This sequence is the last
               thing output to the printer for each print job.  Editing
               this field is exactly like the first escape sequence above.
    F8         adds a new printer to the list.  When F8 is pressed the
               program prompts for each of the parameters on the right and
               then returns control to the printer list.  The new printer
               is added at the end of the list.
    F9         deletes the printer currently pointed to.
    F10        saves the printer configuration.
    ESC        exits the printer configuration.
<HLP_GRP01301>
                   Holiday Configuration Help                Page 1 of 3

    This screen allows you to add, modify and delete the holidays which 
    are automatically placed into the monthly calendars when they are 
    first generated.

    The up and down arrow keys can be used to move the arrow (->) on the
    left through the list of holidays.  The parameters for the one cur-
    rently pointed to are displayed to the right.

    The following keys can be used in this configuration menu.

    F1         brings up this help screen.
    F2         allows the editing of the holiday parameters.  The first
               field sets the type of holiday.  Use the space bar to cycle
               through the possible selections.  Press Enter when the
               desired one appears.  The program will then prompt you for
               the remaining parameters required for the selected holiday
               type.  Press Esc in any field to cancel the edit and dis-
               card any changes.  Pressing Enter on the last field accepts
               the changes.
<HLP_GRP01302>
                   Holiday Configuration Help                Page 2 of 3

    F3         adds a new holiday at the end of the list.  The procedure
               is the same as for F2, above.  The initial values for the
               fields are set to those of the holiday currently pointed to.
    F4         deletes the holiday currently pointed to.
    F5         saves the configuration to a file.
    Page Up    brings up the previous page, if any.
    Page Down  brings up the next page, if any.
    ESC        exits the configuration.

    There are 3 types of holidays which may be set:
       Month/Day Every Year - these occur on a specific month and day
          every year (e.g. December 25 for Christmas).
       Month And Nth Day Of Week - these occur on a specific day of the
          week in a month (e.g. 4th Thursday in November for Thanks-
          giving).
       Month/Day/Year - these only occur on one specific date (e.g. April
          19, 1992 for Easter).
    The "Name Line 1:" and "Name Line 2:" parameters set the text which
    will appear in the calendar on the date for the holiday.  The year
    field gives the year minus 1900 (e.g. 92 for 1992).  The month field
<HLP_GRP01303>
                   Holiday Configuration Help                Page 3 of 3

    can be toggled through the months using the space bar.  The day field
    toggles from 1 through the number of days in the month.  The day of
    week field toggles through the days of the week.

    NOTE - changes to the holiday configuration will not be reflected in
           monthly calendars which have already been saved.  This infor-
           mation is only used when the calendar is first built.
<HLP_GRP01401>
              Start Screen Configuration Help                Page 1 of 1

    This screen allows you to select the first screen displayed when the 
    program is loaded.

    The up and down arrow keys can be used to move the arrow (->) on the
    left through the list of screens.  The currently selected screen is
    highlighted.

    The following keys can be used in this configuration menu.

    F1         brings up this help screen.
    F2         selects the initial screen.  Move the arrow (->) on the
               left to the desired screen using the up and down arrow keys
               and press F2.  That screen will then be highlighted.
    F3         saves the current selection to the configuration file.
    ESC        exits the screen configuration.
<HLP_GRP01501>
                     Alarm Configuration Help                Page 1 of 3

    This screen allows the configuration of the pop-up alarm.

    To make a selection from the pop-up menu highlight it using the up
    and down arrow keys and press Enter or just type the field's bold
    character.  The following options are available on the pop-up menu.

    Edit - Allows the editing of the alarm parameters.  Press Tab to move
       to the next field in the parameter menu and Shift+Tab to move to
       the previous field.  Press Esc to end editing and return to the
       pop-up menu.  If you move into a field and change it and then press
       Esc the changes will be discarded.  To process the changes press
       Tab and then press Esc.
    Play Alarm - plays the alarm as it will sound using the current alarm
       parameters.  The alarm sounds for the given duration.  It can be
       terminated before the end by pressing any key.
    Save - Saves the alarm parameters.
    Help - Brings up this help screen.
    Quit - Exits alarm configuration.
<HLP_GRP01502>
                     Alarm Configuration Help                Page 2 of 3

    The alarm consists of 2 tones with an intervening pause.  The frequen-
    cy values (1st and 4th fields in the parameter menu) can have values
    from 20 to 20000 Hertz.  Lower numbers produce a lower pitched sound.
    The duration of the tones (2nd and 5th fields) and intervening pause
    (3rd field) are input in tenths of seconds.  For example, a value of
    10 represents 10 tenths of a second or 1 second.  The durations can
    vary from 0 to 100 (0 to 10 seconds).  A value of zero for a tone
    means the tone will not play.  A zero pause produces no pause.

    From 0 to 99 of the tone 1/pause/tone 2 sequences can be sounded for
    the alarm.  A zero value produces no sound.

    The snooze duration field sets the number of minutes between when
    "Snooze" is selected to snooze an alarm and when the alarm will 
    resound.  This value can range from 1 to 99 minutes.

    The color bar sets the color of the pop-up alarm message.  Use the
    left/right arrow keys to change the color selection and the up/down
    keys to switch between configuring the foreground and background
    color.
<HLP_GRP01503>
                     Alarm Configuration Help                Page 3 of 3

    The appointment alarm parameters set the initial values displayed in 
    the "Number of minutes before:" and "Duration (minutes):" fields when 
    an appointment alarm is set (see "Appointment" help).

    NOTE - Entering an invalid value in a field produces a beep and the
           field cannot be exited until a valid value is entered.
<HLP_GRP01601>
                     TSR Configuration Help                  Page 1 of 2

    This screen allows the configuration of the TSR parameters.

    To make a selection from the pop-up menu, highlight it using the up
    and down arrow keys and press Enter or just type the field's bold
    character.  The following options are available on the pop-up menu.

    Edit - Allows the editing of the TSR parameters.  Press Tab to move
       to the next field in the parameter menu and Shift+Tab to move to
       the previous field.  Press Esc to end editing and return to the
       pop-up menu.  If you move into a field and change it and then press
       Esc the changes will be discarded.  To process the changes press
       Tab and then press Esc.
    Save - Saves the TSR parameters.
    Help - Brings up this help screen.
    Quit - Exits TSR configuration.

    The "Hot-key" field sets the key(s) that must be pressed to pop up
    program when it is loaded as a TSR.  Press the key or keys you want
    to use and they will be displayed in the field.  Press Tab when you
    have set the desired key sequence.
<HLP_GRP01602>
                     TSR Configuration Help                  Page 2 of 2

    The "Swap order:" fields determine how the program swaps conventional 
    memory in and out when the program is popped up.  The space bar is 
    used to toggle the selection between XMS, EMS and DISK.  The program
    will attempt to use the values in the order specified.  In other
    words, if the program cannot use the first swap method it will try the
    second and then third.  If a field is set to NONE, then it is skipped.

    XMS version 2.0 or higher and EMS version 3.2 or higher is required.

    The "Swap Path" field sets where the program will swap to, if the disk 
    is used.  
<HLP_GRP01701>
                     Time / Date Configuration Help          Page 1 of 2

    This screen allows the configuration of time / date parameters.

    To make a selection from the pop-up menu, highlight it using the up
    and down arrow keys and press Enter or just type the field's bold
    character.  The following options are available on the pop-up menu.

    Edit - Allows the editing of the parameters.  Press Tab to move
       to the next field in the parameter menu and Shift+Tab to move to
       the previous field.  Press Esc to end editing and return to the
       pop-up menu.  If you move into a field and change it and then press
       Esc the changes will be discarded.  To process the changes press
       Tab and then press Esc.
    Save - Saves the parameters.
    Help - Brings up this help screen.
    Quit - Exits this configuration.

   Times can be displayed in 12 hour or 24 hour (military) format.  
   Press the space bar in the "Format:" field to toggle between the 
   two.  The text used for "AM" and "PM" (when in 12 hour mode) can be
   set in the next two fields.  Simply type in the desired text.  The
<HLP_GRP01702>
                     Time / Date Configuration Help          Page 2 of 2

   separator between the hours and minutes can also be set.  Type in
   the desired separator.  The time/date clock, in the upper right of 
   the display, is updated as the parameters are changed.  This
   allows you to see the effect of the changes.

   The order of the day, month and year, in dates, can also be
   configured.  Press the space bar in one of the date order fields to 
   toggle between month, day and year.  The day, month and year are 
   displayed in the order you select.  For example, if the following 
   order is selected:

      Order:    Day   Month Year

   the dates will display as "day/month/year".  
   
   The separator between the day, month and year can also be set.  Simply 
   type in the desired separator in the date separator field.

   IMPORTANT:  Changes to the time format will not be reflected in
   appointment files which have already been saved.
<HLP_GRP01801>
                     Auto Save Configuration Help            Page 1 of 1

    This screen allows the configuration of the auto save feature.

    Pressing the space bar toggles the selection between ON and OFF.
    Pressing Enter saves the selection.  Pressing Escape cancels any 
    changes made to the selection.

    When the auto save feature is on, the appointment, alarm and monthly 
    calendar screens are automatically saved when you exit the program or
    move to another screen.  When auto save is off, the program will 
    prompt you to determine if you want to save the changes, if any, you
    have made.
